\documentclass[11pt,twocolumn]{IEEEtran}

% Use whatever packages you want here

\setlength{\textheight}{9in}
\setlength{\columnsep}{.25in}
\setlength{\oddsidemargin}{-.25in}
\setlength{\textwidth}{6.75in}

\begin{document}

\title{Paper Title Here}
\author{Author Names}

% Citations using ACM or IEEE style.

% Use \bibliographystyle{IEEE} or \bibliographystyle{acm}

\end{document} 
